\hypertarget{structmom__restart_1_1p3d}{}\section{mom\+\_\+restart\+:\+:p3d Type Reference}
\label{structmom__restart_1_1p3d}\index{mom\+\_\+restart\+::p3d@{mom\+\_\+restart\+::p3d}}


\subsection{Detailed Description}
A type for making arrays of pointers to 3-\/d arrays. 

Definition at line 39 of file M\+O\+M\+\_\+restart.\+F90.



Collaboration diagram for mom\+\_\+restart\+:\+:p3d\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=184pt]{structmom__restart_1_1p3d__coll__graph}
\end{center}
\end{figure}
\subsection*{Private variables and constants}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{structmom__restart_1_1p3d_adca83a5353742af0ea3dfda4da8f7ff4}\label{structmom__restart_1_1p3d_adca83a5353742af0ea3dfda4da8f7ff4}} 
real, dimension(\+:,\+:,\+:), pointer \hyperlink{structmom__restart_1_1p3d_adca83a5353742af0ea3dfda4da8f7ff4}{p} =$>$ N\+U\+LL()
\begin{DoxyCompactList}\small\item\em A pointer to a 3d array. \end{DoxyCompactList}\end{DoxyCompactItemize}


\subsection{Detailed Description}
A type for making arrays of pointers to 3-\/d arrays. 

Definition at line 39 of file M\+O\+M\+\_\+restart.\+F90.



The documentation for this type was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
/home/cermak/src/\+M\+O\+M6.\+devrob/src/framework/M\+O\+M\+\_\+restart.\+F90\end{DoxyCompactItemize}
