\hypertarget{structmom__restart_1_1field__restart}{}\section{mom\+\_\+restart\+:\+:field\+\_\+restart Type Reference}
\label{structmom__restart_1_1field__restart}\index{mom\+\_\+restart\+::field\+\_\+restart@{mom\+\_\+restart\+::field\+\_\+restart}}


\subsection{Detailed Description}
A structure with information about a single restart field. 

Definition at line 59 of file M\+O\+M\+\_\+restart.\+F90.



Collaboration diagram for mom\+\_\+restart\+:\+:field\+\_\+restart\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=330pt]{structmom__restart_1_1field__restart__coll__graph}
\end{center}
\end{figure}
\subsection*{Private variables and constants}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{structmom__restart_1_1field__restart_a48db81ddeffe97eabd6ff1020bab4089}\label{structmom__restart_1_1field__restart_a48db81ddeffe97eabd6ff1020bab4089}} 
type(vardesc) \hyperlink{structmom__restart_1_1field__restart_a48db81ddeffe97eabd6ff1020bab4089}{vars}
\begin{DoxyCompactList}\small\item\em Description of a field that is to be read from or written to the restart file. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__restart_1_1field__restart_a5a354f4417fec017b8bd932053e434c2}\label{structmom__restart_1_1field__restart_a5a354f4417fec017b8bd932053e434c2}} 
logical \hyperlink{structmom__restart_1_1field__restart_a5a354f4417fec017b8bd932053e434c2}{mand\+\_\+var}
\begin{DoxyCompactList}\small\item\em If .true. the run will abort if this field is not successfully read from the restart file. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__restart_1_1field__restart_af77e4f35d18dc561427d2b68769daabe}\label{structmom__restart_1_1field__restart_af77e4f35d18dc561427d2b68769daabe}} 
logical \hyperlink{structmom__restart_1_1field__restart_af77e4f35d18dc561427d2b68769daabe}{initialized}
\begin{DoxyCompactList}\small\item\em .true. if this field has been read from the restart file. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__restart_1_1field__restart_ab06fd545f649b786f79aff2eaa6227f4}\label{structmom__restart_1_1field__restart_ab06fd545f649b786f79aff2eaa6227f4}} 
character(len=32) \hyperlink{structmom__restart_1_1field__restart_ab06fd545f649b786f79aff2eaa6227f4}{var\+\_\+name}
\begin{DoxyCompactList}\small\item\em A name by which a variable may be queried. \end{DoxyCompactList}\end{DoxyCompactItemize}


\subsection{Detailed Description}
A structure with information about a single restart field. 

Definition at line 59 of file M\+O\+M\+\_\+restart.\+F90.



The documentation for this type was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
/home/cermak/src/\+M\+O\+M6.\+devrob/src/framework/M\+O\+M\+\_\+restart.\+F90\end{DoxyCompactItemize}
