\hypertarget{structcoord__rho_1_1rho__cs}{}\section{coord\+\_\+rho\+:\+:rho\+\_\+cs Type Reference}
\label{structcoord__rho_1_1rho__cs}\index{coord\+\_\+rho\+::rho\+\_\+cs@{coord\+\_\+rho\+::rho\+\_\+cs}}


\subsection{Detailed Description}
Control structure containing required parameters for the rho coordinate. 

Definition at line 14 of file coord\+\_\+rho.\+F90.



Collaboration diagram for coord\+\_\+rho\+:\+:rho\+\_\+cs\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=350pt]{structcoord__rho_1_1rho__cs__coll__graph}
\end{center}
\end{figure}
\subsection*{Public variables and constants}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{structcoord__rho_1_1rho__cs_a39fa2744cb273902c9b0ec3aebff2dc8}\label{structcoord__rho_1_1rho__cs_a39fa2744cb273902c9b0ec3aebff2dc8}} 
integer \hyperlink{structcoord__rho_1_1rho__cs_a39fa2744cb273902c9b0ec3aebff2dc8}{nk}
\begin{DoxyCompactList}\small\item\em Number of layers. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structcoord__rho_1_1rho__cs_a2a553f33f058b03209e58696693f117f}\label{structcoord__rho_1_1rho__cs_a2a553f33f058b03209e58696693f117f}} 
real \hyperlink{structcoord__rho_1_1rho__cs_a2a553f33f058b03209e58696693f117f}{min\+\_\+thickness} = 0.
\begin{DoxyCompactList}\small\item\em Minimum thickness allowed for layers, often in \mbox{[}H $\sim$$>$ m or kg m-\/2\mbox{]}. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structcoord__rho_1_1rho__cs_a0fca6199dab54f309fad7ecdb89e8f86}\label{structcoord__rho_1_1rho__cs_a0fca6199dab54f309fad7ecdb89e8f86}} 
real \hyperlink{structcoord__rho_1_1rho__cs_a0fca6199dab54f309fad7ecdb89e8f86}{ref\+\_\+pressure}
\begin{DoxyCompactList}\small\item\em Reference pressure for density calculations \mbox{[}R L2 T-\/2 $\sim$$>$ Pa\mbox{]}. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structcoord__rho_1_1rho__cs_af86265c38adedbbdceb2a04bc669b28b}\label{structcoord__rho_1_1rho__cs_af86265c38adedbbdceb2a04bc669b28b}} 
logical \hyperlink{structcoord__rho_1_1rho__cs_af86265c38adedbbdceb2a04bc669b28b}{integrate\+\_\+downward\+\_\+for\+\_\+e} = .false.
\begin{DoxyCompactList}\small\item\em If true, integrate for interface positions from the top downward. If false, integrate from the bottom upward, as does the rest of the model. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structcoord__rho_1_1rho__cs_adfa829a02bfcedbf71d9748fc87dc0e3}\label{structcoord__rho_1_1rho__cs_adfa829a02bfcedbf71d9748fc87dc0e3}} 
real, dimension(\+:), allocatable \hyperlink{structcoord__rho_1_1rho__cs_adfa829a02bfcedbf71d9748fc87dc0e3}{target\+\_\+density}
\begin{DoxyCompactList}\small\item\em Nominal density of interfaces \mbox{[}R $\sim$$>$ kg m-\/3\mbox{]}. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structcoord__rho_1_1rho__cs_a67c1800cda43051a84bdd385c3d8f329}\label{structcoord__rho_1_1rho__cs_a67c1800cda43051a84bdd385c3d8f329}} 
type(interp\+\_\+cs\+\_\+type) \hyperlink{structcoord__rho_1_1rho__cs_a67c1800cda43051a84bdd385c3d8f329}{interp\+\_\+cs}
\begin{DoxyCompactList}\small\item\em Interpolation control structure. \end{DoxyCompactList}\end{DoxyCompactItemize}


\subsection{Detailed Description}
Control structure containing required parameters for the rho coordinate. 

Definition at line 14 of file coord\+\_\+rho.\+F90.



The documentation for this type was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
/home/cermak/src/\+M\+O\+M6.\+devrob/src/\+A\+L\+E/coord\+\_\+rho.\+F90\end{DoxyCompactItemize}
