\hypertarget{structuser__change__diffusivity_1_1user__change__diff__cs}{}\doxysection{user\+\_\+change\+\_\+diffusivity\+::user\+\_\+change\+\_\+diff\+\_\+cs Type Reference}
\label{structuser__change__diffusivity_1_1user__change__diff__cs}\index{user\_change\_diffusivity::user\_change\_diff\_cs@{user\_change\_diffusivity::user\_change\_diff\_cs}}


\doxysubsection{Detailed Description}
Control structure for \mbox{\hyperlink{namespaceuser__change__diffusivity}{user\+\_\+change\+\_\+diffusivity}}. 

Definition at line 27 of file user\+\_\+change\+\_\+diffusivity.\+F90.



Collaboration diagram for user\+\_\+change\+\_\+diffusivity\+::user\+\_\+change\+\_\+diff\+\_\+cs\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=287pt]{structuser__change__diffusivity_1_1user__change__diff__cs__coll__graph}
\end{center}
\end{figure}
\doxysubsection*{Public variables and constants}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{structuser__change__diffusivity_1_1user__change__diff__cs_aeda69da5d3c88e1825e04d3c4a0b3559}\label{structuser__change__diffusivity_1_1user__change__diff__cs_aeda69da5d3c88e1825e04d3c4a0b3559}} 
real \mbox{\hyperlink{structuser__change__diffusivity_1_1user__change__diff__cs_aeda69da5d3c88e1825e04d3c4a0b3559}{kd\+\_\+add}}
\begin{DoxyCompactList}\small\item\em The scale of a diffusivity that is added everywhere without any filtering or scaling \mbox{[}Z2 T-\/1 $\sim$$>$ m2 s-\/1\mbox{]}. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structuser__change__diffusivity_1_1user__change__diff__cs_a9845390906d282605d8fd39b1765bc67}\label{structuser__change__diffusivity_1_1user__change__diff__cs_a9845390906d282605d8fd39b1765bc67}} 
real, dimension(4) \mbox{\hyperlink{structuser__change__diffusivity_1_1user__change__diff__cs_a9845390906d282605d8fd39b1765bc67}{lat\+\_\+range}}
\begin{DoxyCompactList}\small\item\em 4 values that define the latitude range over which a diffusivity scaled by Kd\+\_\+add is added \mbox{[}deg\+Lat\mbox{]}. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structuser__change__diffusivity_1_1user__change__diff__cs_a781a6ae98007919dc3d234658b602d02}\label{structuser__change__diffusivity_1_1user__change__diff__cs_a781a6ae98007919dc3d234658b602d02}} 
real, dimension(4) \mbox{\hyperlink{structuser__change__diffusivity_1_1user__change__diff__cs_a781a6ae98007919dc3d234658b602d02}{rho\+\_\+range}}
\begin{DoxyCompactList}\small\item\em 4 values that define the coordinate potential density range over which a diffusivity scaled by Kd\+\_\+add is added \mbox{[}R $\sim$$>$ kg m-\/3\mbox{]}. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structuser__change__diffusivity_1_1user__change__diff__cs_a134f3160c1c574180bc7863bf82a62fd}\label{structuser__change__diffusivity_1_1user__change__diff__cs_a134f3160c1c574180bc7863bf82a62fd}} 
logical \mbox{\hyperlink{structuser__change__diffusivity_1_1user__change__diff__cs_a134f3160c1c574180bc7863bf82a62fd}{use\+\_\+abs\+\_\+lat}}
\begin{DoxyCompactList}\small\item\em If true, use the absolute value of latitude when setting lat\+\_\+range. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structuser__change__diffusivity_1_1user__change__diff__cs_a7cdf1001859d57ea6d20406c607a07ec}\label{structuser__change__diffusivity_1_1user__change__diff__cs_a7cdf1001859d57ea6d20406c607a07ec}} 
type(diag\+\_\+ctrl), pointer \mbox{\hyperlink{structuser__change__diffusivity_1_1user__change__diff__cs_a7cdf1001859d57ea6d20406c607a07ec}{diag}} =$>$ N\+U\+LL()
\begin{DoxyCompactList}\small\item\em A structure that is used to regulate the timing of diagnostic output. \end{DoxyCompactList}\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}
Control structure for \mbox{\hyperlink{namespaceuser__change__diffusivity}{user\+\_\+change\+\_\+diffusivity}}. 

Definition at line 27 of file user\+\_\+change\+\_\+diffusivity.\+F90.



The documentation for this type was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
/home/cermak/src/\+M\+O\+M6.\+devrob/src/user/user\+\_\+change\+\_\+diffusivity.\+F90\end{DoxyCompactItemize}
