\hypertarget{structshelfwave__initialization_1_1shelfwave__obc__cs}{}\doxysection{shelfwave\+\_\+initialization\+::shelfwave\+\_\+obc\+\_\+cs Type Reference}
\label{structshelfwave__initialization_1_1shelfwave__obc__cs}\index{shelfwave\_initialization::shelfwave\_obc\_cs@{shelfwave\_initialization::shelfwave\_obc\_cs}}


\doxysubsection{Detailed Description}
Control structure for shelfwave open boundaries. 

Definition at line 29 of file shelfwave\+\_\+initialization.\+F90.



Collaboration diagram for shelfwave\+\_\+initialization\+::shelfwave\+\_\+obc\+\_\+cs\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=212pt]{structshelfwave__initialization_1_1shelfwave__obc__cs__coll__graph}
\end{center}
\end{figure}
\doxysubsection*{Public variables and constants}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{structshelfwave__initialization_1_1shelfwave__obc__cs_ace0e9fb3a54983baabac63cecb1de614}\label{structshelfwave__initialization_1_1shelfwave__obc__cs_ace0e9fb3a54983baabac63cecb1de614}} 
real \mbox{\hyperlink{structshelfwave__initialization_1_1shelfwave__obc__cs_ace0e9fb3a54983baabac63cecb1de614}{lx}} = 100.\+0
\begin{DoxyCompactList}\small\item\em Long-\/shore length scale of bathymetry. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structshelfwave__initialization_1_1shelfwave__obc__cs_ad0c354c96d19d764ceb6f5ae220e2d1a}\label{structshelfwave__initialization_1_1shelfwave__obc__cs_ad0c354c96d19d764ceb6f5ae220e2d1a}} 
real \mbox{\hyperlink{structshelfwave__initialization_1_1shelfwave__obc__cs_ad0c354c96d19d764ceb6f5ae220e2d1a}{ly}} = 50.\+0
\begin{DoxyCompactList}\small\item\em Cross-\/shore length scale. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structshelfwave__initialization_1_1shelfwave__obc__cs_aabafd337438d8bcd3623e8c217bcd107}\label{structshelfwave__initialization_1_1shelfwave__obc__cs_aabafd337438d8bcd3623e8c217bcd107}} 
real \mbox{\hyperlink{structshelfwave__initialization_1_1shelfwave__obc__cs_aabafd337438d8bcd3623e8c217bcd107}{f0}} = 1.e-\/4
\begin{DoxyCompactList}\small\item\em Coriolis parameter. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structshelfwave__initialization_1_1shelfwave__obc__cs_a9228c9459d9077a237f61fcc4591cbc1}\label{structshelfwave__initialization_1_1shelfwave__obc__cs_a9228c9459d9077a237f61fcc4591cbc1}} 
real \mbox{\hyperlink{structshelfwave__initialization_1_1shelfwave__obc__cs_a9228c9459d9077a237f61fcc4591cbc1}{jj}} = 1
\begin{DoxyCompactList}\small\item\em Cross-\/shore wave mode. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structshelfwave__initialization_1_1shelfwave__obc__cs_a4e947f8c08025682e4c34c03218afe26}\label{structshelfwave__initialization_1_1shelfwave__obc__cs_a4e947f8c08025682e4c34c03218afe26}} 
real \mbox{\hyperlink{structshelfwave__initialization_1_1shelfwave__obc__cs_a4e947f8c08025682e4c34c03218afe26}{kk}}
\begin{DoxyCompactList}\small\item\em Parameter. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structshelfwave__initialization_1_1shelfwave__obc__cs_a7d874df3258ceb561e86dd0451206eb6}\label{structshelfwave__initialization_1_1shelfwave__obc__cs_a7d874df3258ceb561e86dd0451206eb6}} 
real \mbox{\hyperlink{structshelfwave__initialization_1_1shelfwave__obc__cs_a7d874df3258ceb561e86dd0451206eb6}{ll}}
\begin{DoxyCompactList}\small\item\em Longshore wavenumber. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structshelfwave__initialization_1_1shelfwave__obc__cs_a426da309fdfcf107250e74423db5df3b}\label{structshelfwave__initialization_1_1shelfwave__obc__cs_a426da309fdfcf107250e74423db5df3b}} 
real \mbox{\hyperlink{structshelfwave__initialization_1_1shelfwave__obc__cs_a426da309fdfcf107250e74423db5df3b}{alpha}}
\begin{DoxyCompactList}\small\item\em 1/\+Ly. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structshelfwave__initialization_1_1shelfwave__obc__cs_a3f9c777ae21fdeeffe98b4860b0f10e3}\label{structshelfwave__initialization_1_1shelfwave__obc__cs_a3f9c777ae21fdeeffe98b4860b0f10e3}} 
real \mbox{\hyperlink{structshelfwave__initialization_1_1shelfwave__obc__cs_a3f9c777ae21fdeeffe98b4860b0f10e3}{omega}}
\begin{DoxyCompactList}\small\item\em Frequency. \end{DoxyCompactList}\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}
Control structure for shelfwave open boundaries. 

Definition at line 29 of file shelfwave\+\_\+initialization.\+F90.



The documentation for this type was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
/home/cermak/src/\+M\+O\+M6.\+devrob/src/user/shelfwave\+\_\+initialization.\+F90\end{DoxyCompactItemize}
