\hypertarget{structmom__restart_1_1obsolete__restart}{}\doxysection{mom\+\_\+restart\+::obsolete\+\_\+restart Type Reference}
\label{structmom__restart_1_1obsolete__restart}\index{mom\_restart::obsolete\_restart@{mom\_restart::obsolete\_restart}}


\doxysubsection{Detailed Description}
A structure to store information about restart fields that are no longer used. 

Definition at line 69 of file M\+O\+M\+\_\+restart.\+F90.



Collaboration diagram for mom\+\_\+restart\+::obsolete\+\_\+restart\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=242pt]{structmom__restart_1_1obsolete__restart__coll__graph}
\end{center}
\end{figure}
\doxysubsection*{Private variables and constants}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{structmom__restart_1_1obsolete__restart_a5ed0a047be13dfddacff5451da8560c1}\label{structmom__restart_1_1obsolete__restart_a5ed0a047be13dfddacff5451da8560c1}} 
character(len=32) \mbox{\hyperlink{structmom__restart_1_1obsolete__restart_a5ed0a047be13dfddacff5451da8560c1}{field\+\_\+name}}
\begin{DoxyCompactList}\small\item\em Name of restart field that is no longer in use. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__restart_1_1obsolete__restart_ae77cc072bc498de4a3a58113cc06ad0d}\label{structmom__restart_1_1obsolete__restart_ae77cc072bc498de4a3a58113cc06ad0d}} 
character(len=32) \mbox{\hyperlink{structmom__restart_1_1obsolete__restart_ae77cc072bc498de4a3a58113cc06ad0d}{replacement\+\_\+name}}
\begin{DoxyCompactList}\small\item\em Name of replacement restart field, if applicable. \end{DoxyCompactList}\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}
A structure to store information about restart fields that are no longer used. 

Definition at line 69 of file M\+O\+M\+\_\+restart.\+F90.



The documentation for this type was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
/home/cermak/src/\+M\+O\+M6.\+devrob/src/framework/M\+O\+M\+\_\+restart.\+F90\end{DoxyCompactItemize}
