\hypertarget{structdyed__channel__initialization_1_1dyed__channel__obc__cs}{}\doxysection{dyed\+\_\+channel\+\_\+initialization\+::dyed\+\_\+channel\+\_\+obc\+\_\+cs Type Reference}
\label{structdyed__channel__initialization_1_1dyed__channel__obc__cs}\index{dyed\_channel\_initialization::dyed\_channel\_obc\_cs@{dyed\_channel\_initialization::dyed\_channel\_obc\_cs}}


\doxysubsection{Detailed Description}
Control structure for dyed-\/channel open boundaries. 

Definition at line 28 of file dyed\+\_\+channel\+\_\+initialization.\+F90.



Collaboration diagram for dyed\+\_\+channel\+\_\+initialization\+::dyed\+\_\+channel\+\_\+obc\+\_\+cs\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=230pt]{structdyed__channel__initialization_1_1dyed__channel__obc__cs__coll__graph}
\end{center}
\end{figure}
\doxysubsection*{Public variables and constants}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{structdyed__channel__initialization_1_1dyed__channel__obc__cs_a260f191487331bfd35b5b42096159480}\label{structdyed__channel__initialization_1_1dyed__channel__obc__cs_a260f191487331bfd35b5b42096159480}} 
real \mbox{\hyperlink{structdyed__channel__initialization_1_1dyed__channel__obc__cs_a260f191487331bfd35b5b42096159480}{zonal\+\_\+flow}} = 8.\+57
\begin{DoxyCompactList}\small\item\em Mean inflow. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structdyed__channel__initialization_1_1dyed__channel__obc__cs_a640651df9c92e3b33d9f53dc80ff378b}\label{structdyed__channel__initialization_1_1dyed__channel__obc__cs_a640651df9c92e3b33d9f53dc80ff378b}} 
real \mbox{\hyperlink{structdyed__channel__initialization_1_1dyed__channel__obc__cs_a640651df9c92e3b33d9f53dc80ff378b}{tidal\+\_\+amp}} = 0.\+0
\begin{DoxyCompactList}\small\item\em Sloshing amplitude. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structdyed__channel__initialization_1_1dyed__channel__obc__cs_aa6dab32a1cfaf1c9a5bb60541b247a9a}\label{structdyed__channel__initialization_1_1dyed__channel__obc__cs_aa6dab32a1cfaf1c9a5bb60541b247a9a}} 
real \mbox{\hyperlink{structdyed__channel__initialization_1_1dyed__channel__obc__cs_aa6dab32a1cfaf1c9a5bb60541b247a9a}{frequency}} = 0.\+0
\begin{DoxyCompactList}\small\item\em Sloshing frequency. \end{DoxyCompactList}\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}
Control structure for dyed-\/channel open boundaries. 

Definition at line 28 of file dyed\+\_\+channel\+\_\+initialization.\+F90.



The documentation for this type was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
/home/cermak/src/\+M\+O\+M6.\+devrob/src/user/dyed\+\_\+channel\+\_\+initialization.\+F90\end{DoxyCompactItemize}
