\hypertarget{structmom__cvmix__conv_1_1cvmix__conv__cs}{}\doxysection{mom\+\_\+cvmix\+\_\+conv\+::cvmix\+\_\+conv\+\_\+cs Type Reference}
\label{structmom__cvmix__conv_1_1cvmix__conv__cs}\index{mom\_cvmix\_conv::cvmix\_conv\_cs@{mom\_cvmix\_conv::cvmix\_conv\_cs}}


\doxysubsection{Detailed Description}
Control structure including parameters for C\+V\+Mix convection. 

Definition at line 27 of file M\+O\+M\+\_\+\+C\+V\+Mix\+\_\+conv.\+F90.



Collaboration diagram for mom\+\_\+cvmix\+\_\+conv\+::cvmix\+\_\+conv\+\_\+cs\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=350pt]{structmom__cvmix__conv_1_1cvmix__conv__cs__coll__graph}
\end{center}
\end{figure}
\doxysubsection*{Public variables and constants}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{structmom__cvmix__conv_1_1cvmix__conv__cs_aec5b26466d4040672222cf88073047c0}\label{structmom__cvmix__conv_1_1cvmix__conv__cs_aec5b26466d4040672222cf88073047c0}} 
real \mbox{\hyperlink{structmom__cvmix__conv_1_1cvmix__conv__cs_aec5b26466d4040672222cf88073047c0}{kd\+\_\+conv\+\_\+const}}
\begin{DoxyCompactList}\small\item\em diffusivity constant used in convective regime \mbox{[}m2 s-\/1\mbox{]} \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__cvmix__conv_1_1cvmix__conv__cs_a6006de977c40d751147fae3527860c09}\label{structmom__cvmix__conv_1_1cvmix__conv__cs_a6006de977c40d751147fae3527860c09}} 
real \mbox{\hyperlink{structmom__cvmix__conv_1_1cvmix__conv__cs_a6006de977c40d751147fae3527860c09}{kv\+\_\+conv\+\_\+const}}
\begin{DoxyCompactList}\small\item\em viscosity constant used in convective regime \mbox{[}m2 s-\/1\mbox{]} \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__cvmix__conv_1_1cvmix__conv__cs_a57a0f67dc7656899c40ab62cb9366658}\label{structmom__cvmix__conv_1_1cvmix__conv__cs_a57a0f67dc7656899c40ab62cb9366658}} 
real \mbox{\hyperlink{structmom__cvmix__conv_1_1cvmix__conv__cs_a57a0f67dc7656899c40ab62cb9366658}{bv\+\_\+sqr\+\_\+conv}}
\begin{DoxyCompactList}\small\item\em Threshold for squared buoyancy frequency needed to trigger Brunt-\/\+Vaisala parameterization \mbox{[}s-\/2\mbox{]}. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__cvmix__conv_1_1cvmix__conv__cs_a1c4df0fac9a6ab2152719f9381e86cfe}\label{structmom__cvmix__conv_1_1cvmix__conv__cs_a1c4df0fac9a6ab2152719f9381e86cfe}} 
real \mbox{\hyperlink{structmom__cvmix__conv_1_1cvmix__conv__cs_a1c4df0fac9a6ab2152719f9381e86cfe}{min\+\_\+thickness}}
\begin{DoxyCompactList}\small\item\em Minimum thickness allowed \mbox{[}m\mbox{]}. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__cvmix__conv_1_1cvmix__conv__cs_a50fa2ddd911a95f5f9b9c70f898e95d7}\label{structmom__cvmix__conv_1_1cvmix__conv__cs_a50fa2ddd911a95f5f9b9c70f898e95d7}} 
logical \mbox{\hyperlink{structmom__cvmix__conv_1_1cvmix__conv__cs_a50fa2ddd911a95f5f9b9c70f898e95d7}{debug}}
\begin{DoxyCompactList}\small\item\em If true, turn on debugging. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__cvmix__conv_1_1cvmix__conv__cs_a391b28a3a00fdac2590315ffe1942c10}\label{structmom__cvmix__conv_1_1cvmix__conv__cs_a391b28a3a00fdac2590315ffe1942c10}} 
type(diag\+\_\+ctrl), pointer \mbox{\hyperlink{structmom__cvmix__conv_1_1cvmix__conv__cs_a391b28a3a00fdac2590315ffe1942c10}{diag}} =$>$ N\+U\+LL()
\begin{DoxyCompactList}\small\item\em Pointer to diagnostics control structure. \end{DoxyCompactList}\end{DoxyCompactItemize}
\textbf{ }\par
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{structmom__cvmix__conv_1_1cvmix__conv__cs_aff720d4c7a60b2236f7c618c5e7b291a}\label{structmom__cvmix__conv_1_1cvmix__conv__cs_aff720d4c7a60b2236f7c618c5e7b291a}} 
integer \mbox{\hyperlink{structmom__cvmix__conv_1_1cvmix__conv__cs_aff720d4c7a60b2236f7c618c5e7b291a}{id\+\_\+n2}} = -\/1
\begin{DoxyCompactList}\small\item\em Diagnostics handles. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__cvmix__conv_1_1cvmix__conv__cs_a44d0325ca9e1189d42c842dc7e0fa60e}\label{structmom__cvmix__conv_1_1cvmix__conv__cs_a44d0325ca9e1189d42c842dc7e0fa60e}} 
integer \mbox{\hyperlink{structmom__cvmix__conv_1_1cvmix__conv__cs_a44d0325ca9e1189d42c842dc7e0fa60e}{id\+\_\+kd\+\_\+conv}} = -\/1
\begin{DoxyCompactList}\small\item\em Diagnostics handles. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__cvmix__conv_1_1cvmix__conv__cs_a33dbed29c0df41cedf22d9ee6c530613}\label{structmom__cvmix__conv_1_1cvmix__conv__cs_a33dbed29c0df41cedf22d9ee6c530613}} 
integer \mbox{\hyperlink{structmom__cvmix__conv_1_1cvmix__conv__cs_a33dbed29c0df41cedf22d9ee6c530613}{id\+\_\+kv\+\_\+conv}} = -\/1
\begin{DoxyCompactList}\small\item\em Diagnostics handles. \end{DoxyCompactList}\end{DoxyCompactItemize}



\doxysubsection{Detailed Description}
Control structure including parameters for C\+V\+Mix convection. 

Definition at line 27 of file M\+O\+M\+\_\+\+C\+V\+Mix\+\_\+conv.\+F90.



The documentation for this type was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
/home/cermak/src/\+M\+O\+M6.\+devrob/src/parameterizations/vertical/M\+O\+M\+\_\+\+C\+V\+Mix\+\_\+conv.\+F90\end{DoxyCompactItemize}
