\hypertarget{namespacemom__constants}{}\doxysection{mom\+\_\+constants Module Reference}
\label{namespacemom__constants}\index{mom\_constants@{mom\_constants}}


\doxysubsection{Detailed Description}
Provides a few physical constants. \doxysubsection*{Variables}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{namespacemom__constants_a8387a4d118a6e39dbb4f4894cbb2956b}\label{namespacemom__constants_a8387a4d118a6e39dbb4f4894cbb2956b}} 
real, parameter, public \mbox{\hyperlink{namespacemom__constants_a8387a4d118a6e39dbb4f4894cbb2956b}{celsius\+\_\+kelvin\+\_\+offset}} = 273.\+15
\begin{DoxyCompactList}\small\item\em The constant offset for converting temperatures in Kelvin to Celsius. \end{DoxyCompactList}\end{DoxyCompactItemize}
