\hypertarget{structmom__tracer__advect_1_1tracer__advect__cs}{}\doxysection{mom\+\_\+tracer\+\_\+advect\+::tracer\+\_\+advect\+\_\+cs Type Reference}
\label{structmom__tracer__advect_1_1tracer__advect__cs}\index{mom\_tracer\_advect::tracer\_advect\_cs@{mom\_tracer\_advect::tracer\_advect\_cs}}


\doxysubsection{Detailed Description}
Control structure for this module. 

Definition at line 30 of file M\+O\+M\+\_\+tracer\+\_\+advect.\+F90.



Collaboration diagram for mom\+\_\+tracer\+\_\+advect\+::tracer\+\_\+advect\+\_\+cs\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=350pt]{structmom__tracer__advect_1_1tracer__advect__cs__coll__graph}
\end{center}
\end{figure}
\doxysubsection*{Public variables and constants}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{structmom__tracer__advect_1_1tracer__advect__cs_a2d56c4d435118118da2e753f64c3c414}\label{structmom__tracer__advect_1_1tracer__advect__cs_a2d56c4d435118118da2e753f64c3c414}} 
real \mbox{\hyperlink{structmom__tracer__advect_1_1tracer__advect__cs_a2d56c4d435118118da2e753f64c3c414}{dt}}
\begin{DoxyCompactList}\small\item\em The baroclinic dynamics time step \mbox{[}T $\sim$$>$ s\mbox{]}. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__tracer__advect_1_1tracer__advect__cs_a3c25681a4fd2c42c047625230ab05aa4}\label{structmom__tracer__advect_1_1tracer__advect__cs_a3c25681a4fd2c42c047625230ab05aa4}} 
type(diag\+\_\+ctrl), pointer \mbox{\hyperlink{structmom__tracer__advect_1_1tracer__advect__cs_a3c25681a4fd2c42c047625230ab05aa4}{diag}}
\begin{DoxyCompactList}\small\item\em A structure that is used to regulate the timing of diagnostic output. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__tracer__advect_1_1tracer__advect__cs_a30774a745c211118eca9250c83975922}\label{structmom__tracer__advect_1_1tracer__advect__cs_a30774a745c211118eca9250c83975922}} 
logical \mbox{\hyperlink{structmom__tracer__advect_1_1tracer__advect__cs_a30774a745c211118eca9250c83975922}{debug}}
\begin{DoxyCompactList}\small\item\em If true, write verbose checksums for debugging purposes. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__tracer__advect_1_1tracer__advect__cs_a7acd6414f1e5065674b50f5779b21b23}\label{structmom__tracer__advect_1_1tracer__advect__cs_a7acd6414f1e5065674b50f5779b21b23}} 
logical \mbox{\hyperlink{structmom__tracer__advect_1_1tracer__advect__cs_a7acd6414f1e5065674b50f5779b21b23}{useppm}}
\begin{DoxyCompactList}\small\item\em If true, use P\+PM instead of P\+LM. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__tracer__advect_1_1tracer__advect__cs_ae3010b43974ca9f25335bf85c7464f88}\label{structmom__tracer__advect_1_1tracer__advect__cs_ae3010b43974ca9f25335bf85c7464f88}} 
logical \mbox{\hyperlink{structmom__tracer__advect_1_1tracer__advect__cs_ae3010b43974ca9f25335bf85c7464f88}{usehuynh}}
\begin{DoxyCompactList}\small\item\em If true, use the Huynh scheme for P\+PM interface values. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__tracer__advect_1_1tracer__advect__cs_a1e3623714c0d0823d460f206b9dad88b}\label{structmom__tracer__advect_1_1tracer__advect__cs_a1e3623714c0d0823d460f206b9dad88b}} 
type(group\+\_\+pass\+\_\+type) \mbox{\hyperlink{structmom__tracer__advect_1_1tracer__advect__cs_a1e3623714c0d0823d460f206b9dad88b}{pass\+\_\+uhr\+\_\+vhr\+\_\+t\+\_\+hprev}}
\begin{DoxyCompactList}\small\item\em A structred used for group passes. \end{DoxyCompactList}\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}
Control structure for this module. 

Definition at line 30 of file M\+O\+M\+\_\+tracer\+\_\+advect.\+F90.



The documentation for this type was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
/home/cermak/src/\+M\+O\+M6.\+devrob/src/tracer/M\+O\+M\+\_\+tracer\+\_\+advect.\+F90\end{DoxyCompactItemize}
