\hypertarget{structmom__diagnostics_1_1surface__diag__ids}{}\section{mom\+\_\+diagnostics\+::surface\+\_\+diag\+\_\+ids Type Reference}
\label{structmom__diagnostics_1_1surface__diag__ids}\index{mom\_diagnostics::surface\_diag\_ids@{mom\_diagnostics::surface\_diag\_ids}}


\subsection{Detailed Description}
A structure with diagnostic I\+Ds of the surface and integrated variables. 

Definition at line 164 of file M\+O\+M\+\_\+diagnostics.\+F90.



Collaboration diagram for mom\+\_\+diagnostics\+::surface\+\_\+diag\+\_\+ids\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=225pt]{structmom__diagnostics_1_1surface__diag__ids__coll__graph}
\end{center}
\end{figure}
\subsection*{Public variables and constants}
\textbf{ }\par
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{structmom__diagnostics_1_1surface__diag__ids_a57013bd0a1b3582561a215b4bbc221b8}\label{structmom__diagnostics_1_1surface__diag__ids_a57013bd0a1b3582561a215b4bbc221b8}} 
integer \mbox{\hyperlink{structmom__diagnostics_1_1surface__diag__ids_a57013bd0a1b3582561a215b4bbc221b8}{id\+\_\+zos}} = -\/1
\begin{DoxyCompactList}\small\item\em Diagnostic I\+Ds for 2-\/d surface and bottom flux and state fields. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__diagnostics_1_1surface__diag__ids_abbb77b4586df38bf9b77cb26634c3183}\label{structmom__diagnostics_1_1surface__diag__ids_abbb77b4586df38bf9b77cb26634c3183}} 
integer \mbox{\hyperlink{structmom__diagnostics_1_1surface__diag__ids_abbb77b4586df38bf9b77cb26634c3183}{id\+\_\+zossq}} = -\/1
\begin{DoxyCompactList}\small\item\em Diagnostic I\+Ds for 2-\/d surface and bottom flux and state fields. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__diagnostics_1_1surface__diag__ids_a5f79d7e18c3263bf3028b73878401021}\label{structmom__diagnostics_1_1surface__diag__ids_a5f79d7e18c3263bf3028b73878401021}} 
integer \mbox{\hyperlink{structmom__diagnostics_1_1surface__diag__ids_a5f79d7e18c3263bf3028b73878401021}{id\+\_\+volo}} = -\/1
\begin{DoxyCompactList}\small\item\em Diagnostic I\+Ds for 2-\/d surface and bottom flux and state fields. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__diagnostics_1_1surface__diag__ids_ab0a8776dc11f34431bd901db6f27dedb}\label{structmom__diagnostics_1_1surface__diag__ids_ab0a8776dc11f34431bd901db6f27dedb}} 
integer \mbox{\hyperlink{structmom__diagnostics_1_1surface__diag__ids_ab0a8776dc11f34431bd901db6f27dedb}{id\+\_\+speed}} = -\/1
\begin{DoxyCompactList}\small\item\em Diagnostic I\+Ds for 2-\/d surface and bottom flux and state fields. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__diagnostics_1_1surface__diag__ids_a5885baf2e12fc9bf09b5fc156f6d0f60}\label{structmom__diagnostics_1_1surface__diag__ids_a5885baf2e12fc9bf09b5fc156f6d0f60}} 
integer \mbox{\hyperlink{structmom__diagnostics_1_1surface__diag__ids_a5885baf2e12fc9bf09b5fc156f6d0f60}{id\+\_\+ssh}} = -\/1
\begin{DoxyCompactList}\small\item\em Diagnostic I\+Ds for 2-\/d surface and bottom flux and state fields. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__diagnostics_1_1surface__diag__ids_ad60ddd3edf92c005f4ffdfe28cd6e846}\label{structmom__diagnostics_1_1surface__diag__ids_ad60ddd3edf92c005f4ffdfe28cd6e846}} 
integer \mbox{\hyperlink{structmom__diagnostics_1_1surface__diag__ids_ad60ddd3edf92c005f4ffdfe28cd6e846}{id\+\_\+ssh\+\_\+ga}} = -\/1
\begin{DoxyCompactList}\small\item\em Diagnostic I\+Ds for 2-\/d surface and bottom flux and state fields. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__diagnostics_1_1surface__diag__ids_ab61a37beeadb1cf5853aff8b47366a1c}\label{structmom__diagnostics_1_1surface__diag__ids_ab61a37beeadb1cf5853aff8b47366a1c}} 
integer \mbox{\hyperlink{structmom__diagnostics_1_1surface__diag__ids_ab61a37beeadb1cf5853aff8b47366a1c}{id\+\_\+sst}} = -\/1
\begin{DoxyCompactList}\small\item\em Diagnostic I\+Ds for 2-\/d surface and bottom flux and state fields. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__diagnostics_1_1surface__diag__ids_a115534b22b359e495a8820f02d4f3825}\label{structmom__diagnostics_1_1surface__diag__ids_a115534b22b359e495a8820f02d4f3825}} 
integer \mbox{\hyperlink{structmom__diagnostics_1_1surface__diag__ids_a115534b22b359e495a8820f02d4f3825}{id\+\_\+sst\+\_\+sq}} = -\/1
\begin{DoxyCompactList}\small\item\em Diagnostic I\+Ds for 2-\/d surface and bottom flux and state fields. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__diagnostics_1_1surface__diag__ids_a27260ae502c3a9a3ebd4e5a8bf73328b}\label{structmom__diagnostics_1_1surface__diag__ids_a27260ae502c3a9a3ebd4e5a8bf73328b}} 
integer \mbox{\hyperlink{structmom__diagnostics_1_1surface__diag__ids_a27260ae502c3a9a3ebd4e5a8bf73328b}{id\+\_\+sstcon}} = -\/1
\begin{DoxyCompactList}\small\item\em Diagnostic I\+Ds for 2-\/d surface and bottom flux and state fields. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__diagnostics_1_1surface__diag__ids_a9fbba25b09da110583ca808d86b6322b}\label{structmom__diagnostics_1_1surface__diag__ids_a9fbba25b09da110583ca808d86b6322b}} 
integer \mbox{\hyperlink{structmom__diagnostics_1_1surface__diag__ids_a9fbba25b09da110583ca808d86b6322b}{id\+\_\+sss}} = -\/1
\begin{DoxyCompactList}\small\item\em Diagnostic I\+Ds for 2-\/d surface and bottom flux and state fields. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__diagnostics_1_1surface__diag__ids_ab9578924177b35e1b48dfdbe1908caa0}\label{structmom__diagnostics_1_1surface__diag__ids_ab9578924177b35e1b48dfdbe1908caa0}} 
integer \mbox{\hyperlink{structmom__diagnostics_1_1surface__diag__ids_ab9578924177b35e1b48dfdbe1908caa0}{id\+\_\+sss\+\_\+sq}} = -\/1
\begin{DoxyCompactList}\small\item\em Diagnostic I\+Ds for 2-\/d surface and bottom flux and state fields. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__diagnostics_1_1surface__diag__ids_a2828bd1377969bb9034a2fd4a3fd4a8a}\label{structmom__diagnostics_1_1surface__diag__ids_a2828bd1377969bb9034a2fd4a3fd4a8a}} 
integer \mbox{\hyperlink{structmom__diagnostics_1_1surface__diag__ids_a2828bd1377969bb9034a2fd4a3fd4a8a}{id\+\_\+sssabs}} = -\/1
\begin{DoxyCompactList}\small\item\em Diagnostic I\+Ds for 2-\/d surface and bottom flux and state fields. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__diagnostics_1_1surface__diag__ids_a7d9744af5f3d4c1dc5f6e0cbcd2baa14}\label{structmom__diagnostics_1_1surface__diag__ids_a7d9744af5f3d4c1dc5f6e0cbcd2baa14}} 
integer \mbox{\hyperlink{structmom__diagnostics_1_1surface__diag__ids_a7d9744af5f3d4c1dc5f6e0cbcd2baa14}{id\+\_\+ssu}} = -\/1
\begin{DoxyCompactList}\small\item\em Diagnostic I\+Ds for 2-\/d surface and bottom flux and state fields. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__diagnostics_1_1surface__diag__ids_a185e6034af38f11241694852d1844994}\label{structmom__diagnostics_1_1surface__diag__ids_a185e6034af38f11241694852d1844994}} 
integer \mbox{\hyperlink{structmom__diagnostics_1_1surface__diag__ids_a185e6034af38f11241694852d1844994}{id\+\_\+ssv}} = -\/1
\begin{DoxyCompactList}\small\item\em Diagnostic I\+Ds for 2-\/d surface and bottom flux and state fields. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__diagnostics_1_1surface__diag__ids_aa37ec1690b36fff86ff31d7773de08c7}\label{structmom__diagnostics_1_1surface__diag__ids_aa37ec1690b36fff86ff31d7773de08c7}} 
integer \mbox{\hyperlink{structmom__diagnostics_1_1surface__diag__ids_aa37ec1690b36fff86ff31d7773de08c7}{id\+\_\+fraz}} = -\/1
\begin{DoxyCompactList}\small\item\em Diagnostic I\+Ds for 2-\/d surface and bottom flux and state fields. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__diagnostics_1_1surface__diag__ids_a95fc22918915e9e6a2ee9b328e5c927f}\label{structmom__diagnostics_1_1surface__diag__ids_a95fc22918915e9e6a2ee9b328e5c927f}} 
integer \mbox{\hyperlink{structmom__diagnostics_1_1surface__diag__ids_a95fc22918915e9e6a2ee9b328e5c927f}{id\+\_\+salt\+\_\+deficit}} = -\/1
\begin{DoxyCompactList}\small\item\em Diagnostic I\+Ds for 2-\/d surface and bottom flux and state fields. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__diagnostics_1_1surface__diag__ids_a504e8fabb1f08e53d5cb2cf719b62949}\label{structmom__diagnostics_1_1surface__diag__ids_a504e8fabb1f08e53d5cb2cf719b62949}} 
integer \mbox{\hyperlink{structmom__diagnostics_1_1surface__diag__ids_a504e8fabb1f08e53d5cb2cf719b62949}{id\+\_\+heat\+\_\+pme}} = -\/1
\begin{DoxyCompactList}\small\item\em Diagnostic I\+Ds for 2-\/d surface and bottom flux and state fields. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__diagnostics_1_1surface__diag__ids_a1bc5d256ddf959f522058539a73f90b3}\label{structmom__diagnostics_1_1surface__diag__ids_a1bc5d256ddf959f522058539a73f90b3}} 
integer \mbox{\hyperlink{structmom__diagnostics_1_1surface__diag__ids_a1bc5d256ddf959f522058539a73f90b3}{id\+\_\+intern\+\_\+heat}} = -\/1
\begin{DoxyCompactList}\small\item\em Diagnostic I\+Ds for 2-\/d surface and bottom flux and state fields. \end{DoxyCompactList}\end{DoxyCompactItemize}



\subsection{Detailed Description}
A structure with diagnostic I\+Ds of the surface and integrated variables. 

Definition at line 164 of file M\+O\+M\+\_\+diagnostics.\+F90.



The documentation for this type was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
/home/cermak/src/\+M\+O\+M6.\+devrob/src/diagnostics/M\+O\+M\+\_\+diagnostics.\+F90\end{DoxyCompactItemize}
