\hypertarget{structisomip__tracer_1_1isomip__tracer__cs}{}\section{isomip\+\_\+tracer\+::isomip\+\_\+tracer\+\_\+cs Type Reference}
\label{structisomip__tracer_1_1isomip__tracer__cs}\index{isomip\_tracer::isomip\_tracer\_cs@{isomip\_tracer::isomip\_tracer\_cs}}


\subsection{Detailed Description}
I\+S\+O\+M\+IP tracer package control structure. 

Definition at line 45 of file I\+S\+O\+M\+I\+P\+\_\+tracer.\+F90.



Collaboration diagram for isomip\+\_\+tracer\+::isomip\+\_\+tracer\+\_\+cs\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=350pt]{structisomip__tracer_1_1isomip__tracer__cs__coll__graph}
\end{center}
\end{figure}
\subsection*{Public variables and constants}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{structisomip__tracer_1_1isomip__tracer__cs_a309dfafc5958b45173680f1e13e6c933}\label{structisomip__tracer_1_1isomip__tracer__cs_a309dfafc5958b45173680f1e13e6c933}} 
logical \mbox{\hyperlink{structisomip__tracer_1_1isomip__tracer__cs_a309dfafc5958b45173680f1e13e6c933}{coupled\+\_\+tracers}} = .false.
\begin{DoxyCompactList}\small\item\em These tracers are not offered to the coupler. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structisomip__tracer_1_1isomip__tracer__cs_a275d99a8523054c500bce5de8424d9be}\label{structisomip__tracer_1_1isomip__tracer__cs_a275d99a8523054c500bce5de8424d9be}} 
character(len=200) \mbox{\hyperlink{structisomip__tracer_1_1isomip__tracer__cs_a275d99a8523054c500bce5de8424d9be}{tracer\+\_\+ic\+\_\+file}}
\begin{DoxyCompactList}\small\item\em The full path to the IC file, or \char`\"{} \char`\"{} to initialize internally. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structisomip__tracer_1_1isomip__tracer__cs_a92f1c4158ec0d63a48e56380cffcd622}\label{structisomip__tracer_1_1isomip__tracer__cs_a92f1c4158ec0d63a48e56380cffcd622}} 
type(time\+\_\+type), pointer \mbox{\hyperlink{structisomip__tracer_1_1isomip__tracer__cs_a92f1c4158ec0d63a48e56380cffcd622}{time}}
\begin{DoxyCompactList}\small\item\em A pointer to the ocean model\textquotesingle{}s clock. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structisomip__tracer_1_1isomip__tracer__cs_a3cfc57af2051bfcde6e0c7c7e1173467}\label{structisomip__tracer_1_1isomip__tracer__cs_a3cfc57af2051bfcde6e0c7c7e1173467}} 
type(tracer\+\_\+registry\+\_\+type), pointer \mbox{\hyperlink{structisomip__tracer_1_1isomip__tracer__cs_a3cfc57af2051bfcde6e0c7c7e1173467}{tr\+\_\+reg}} =$>$ N\+U\+LL()
\begin{DoxyCompactList}\small\item\em A pointer to the M\+OM tracer registry. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structisomip__tracer_1_1isomip__tracer__cs_a2f4da2b6ca7241c68f94ef7178d592d6}\label{structisomip__tracer_1_1isomip__tracer__cs_a2f4da2b6ca7241c68f94ef7178d592d6}} 
real, dimension(\+:,\+:,\+:,\+:), pointer \mbox{\hyperlink{structisomip__tracer_1_1isomip__tracer__cs_a2f4da2b6ca7241c68f94ef7178d592d6}{tr}} =$>$ N\+U\+LL()
\begin{DoxyCompactList}\small\item\em The array of tracers used in this package, in g m-\/3? \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structisomip__tracer_1_1isomip__tracer__cs_a668045713adf6f333508cd799989913b}\label{structisomip__tracer_1_1isomip__tracer__cs_a668045713adf6f333508cd799989913b}} 
real, dimension(\mbox{\hyperlink{namespaceisomip__tracer_a45a3a4465d55afd6310d5a3412b2c9c5}{ntr}}) \mbox{\hyperlink{structisomip__tracer_1_1isomip__tracer__cs_a668045713adf6f333508cd799989913b}{land\+\_\+val}} = -\/1.\+0
\begin{DoxyCompactList}\small\item\em The value of tr used where land is masked out. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structisomip__tracer_1_1isomip__tracer__cs_ae20d8f11808f3f35d0324930a9bda9b0}\label{structisomip__tracer_1_1isomip__tracer__cs_ae20d8f11808f3f35d0324930a9bda9b0}} 
logical \mbox{\hyperlink{structisomip__tracer_1_1isomip__tracer__cs_ae20d8f11808f3f35d0324930a9bda9b0}{use\+\_\+sponge}}
\begin{DoxyCompactList}\small\item\em If true, sponges may be applied somewhere in the domain. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structisomip__tracer_1_1isomip__tracer__cs_ae5983d46333ee654283f2fa24ff56d10}\label{structisomip__tracer_1_1isomip__tracer__cs_ae5983d46333ee654283f2fa24ff56d10}} 
integer, dimension(\mbox{\hyperlink{namespaceisomip__tracer_a45a3a4465d55afd6310d5a3412b2c9c5}{ntr}}) \mbox{\hyperlink{structisomip__tracer_1_1isomip__tracer__cs_ae5983d46333ee654283f2fa24ff56d10}{ind\+\_\+tr}}
\begin{DoxyCompactList}\small\item\em Indices returned by aof\+\_\+set\+\_\+coupler\+\_\+flux if it is used and the surface tracer concentrations are to be provided to the coupler. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structisomip__tracer_1_1isomip__tracer__cs_ae519061c55c6e05adffce1a6bf75a9d9}\label{structisomip__tracer_1_1isomip__tracer__cs_ae519061c55c6e05adffce1a6bf75a9d9}} 
type(diag\+\_\+ctrl), pointer \mbox{\hyperlink{structisomip__tracer_1_1isomip__tracer__cs_ae519061c55c6e05adffce1a6bf75a9d9}{diag}}
\begin{DoxyCompactList}\small\item\em A structure that is used to regulate the timing of diagnostic output. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structisomip__tracer_1_1isomip__tracer__cs_a9315e8ceda84c29deed0d0e093a68b56}\label{structisomip__tracer_1_1isomip__tracer__cs_a9315e8ceda84c29deed0d0e093a68b56}} 
type(vardesc), dimension(\mbox{\hyperlink{namespaceisomip__tracer_a45a3a4465d55afd6310d5a3412b2c9c5}{ntr}}) \mbox{\hyperlink{structisomip__tracer_1_1isomip__tracer__cs_a9315e8ceda84c29deed0d0e093a68b56}{tr\+\_\+desc}}
\begin{DoxyCompactList}\small\item\em Descriptions and metadata for the tracers in this package. \end{DoxyCompactList}\end{DoxyCompactItemize}


\subsection{Detailed Description}
I\+S\+O\+M\+IP tracer package control structure. 

Definition at line 45 of file I\+S\+O\+M\+I\+P\+\_\+tracer.\+F90.



The documentation for this type was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
/home/cermak/src/\+M\+O\+M6.\+devrob/src/tracer/I\+S\+O\+M\+I\+P\+\_\+tracer.\+F90\end{DoxyCompactItemize}
