\hypertarget{structcoord__hycom_1_1hycom__cs}{}\section{coord\+\_\+hycom\+::hycom\+\_\+cs Type Reference}
\label{structcoord__hycom_1_1hycom__cs}\index{coord\_hycom::hycom\_cs@{coord\_hycom::hycom\_cs}}


\subsection{Detailed Description}
Control structure containing required parameters for the Hy\+C\+OM coordinate. 

Definition at line 13 of file coord\+\_\+hycom.\+F90.



Collaboration diagram for coord\+\_\+hycom\+::hycom\+\_\+cs\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=350pt]{structcoord__hycom_1_1hycom__cs__coll__graph}
\end{center}
\end{figure}
\subsection*{Public variables and constants}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{structcoord__hycom_1_1hycom__cs_a1039ec0e05cd3526170a142796bdfe49}\label{structcoord__hycom_1_1hycom__cs_a1039ec0e05cd3526170a142796bdfe49}} 
integer \mbox{\hyperlink{structcoord__hycom_1_1hycom__cs_a1039ec0e05cd3526170a142796bdfe49}{nk}}
\begin{DoxyCompactList}\small\item\em Number of layers/levels in generated grid. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structcoord__hycom_1_1hycom__cs_a0761a8bce5000df8da537ee364202b19}\label{structcoord__hycom_1_1hycom__cs_a0761a8bce5000df8da537ee364202b19}} 
real, dimension(\+:), allocatable \mbox{\hyperlink{structcoord__hycom_1_1hycom__cs_a0761a8bce5000df8da537ee364202b19}{coordinateresolution}}
\begin{DoxyCompactList}\small\item\em Nominal near-\/surface resolution \mbox{[}Z $\sim$$>$ m\mbox{]}. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structcoord__hycom_1_1hycom__cs_abe45901dc8d822901722daf816701200}\label{structcoord__hycom_1_1hycom__cs_abe45901dc8d822901722daf816701200}} 
real, dimension(\+:), allocatable \mbox{\hyperlink{structcoord__hycom_1_1hycom__cs_abe45901dc8d822901722daf816701200}{target\+\_\+density}}
\begin{DoxyCompactList}\small\item\em Nominal density of interfaces \mbox{[}R $\sim$$>$ kg m-\/3\mbox{]}. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structcoord__hycom_1_1hycom__cs_a0d0bce5a75bdea4e934976778605bd80}\label{structcoord__hycom_1_1hycom__cs_a0d0bce5a75bdea4e934976778605bd80}} 
real, dimension(\+:), allocatable \mbox{\hyperlink{structcoord__hycom_1_1hycom__cs_a0d0bce5a75bdea4e934976778605bd80}{max\+\_\+interface\+\_\+depths}}
\begin{DoxyCompactList}\small\item\em Maximum depths of interfaces \mbox{[}H $\sim$$>$ m or kg m-\/2\mbox{]}. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structcoord__hycom_1_1hycom__cs_a422990f9f44e063313439af2251dc39d}\label{structcoord__hycom_1_1hycom__cs_a422990f9f44e063313439af2251dc39d}} 
real, dimension(\+:), allocatable \mbox{\hyperlink{structcoord__hycom_1_1hycom__cs_a422990f9f44e063313439af2251dc39d}{max\+\_\+layer\+\_\+thickness}}
\begin{DoxyCompactList}\small\item\em Maximum thicknesses of layers \mbox{[}H $\sim$$>$ m or kg m-\/2\mbox{]}. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structcoord__hycom_1_1hycom__cs_acd522b03ad78c566f4cba4b2aec34760}\label{structcoord__hycom_1_1hycom__cs_acd522b03ad78c566f4cba4b2aec34760}} 
type(interp\+\_\+cs\+\_\+type) \mbox{\hyperlink{structcoord__hycom_1_1hycom__cs_acd522b03ad78c566f4cba4b2aec34760}{interp\+\_\+cs}}
\begin{DoxyCompactList}\small\item\em Interpolation control structure. \end{DoxyCompactList}\end{DoxyCompactItemize}


\subsection{Detailed Description}
Control structure containing required parameters for the Hy\+C\+OM coordinate. 

Definition at line 13 of file coord\+\_\+hycom.\+F90.



The documentation for this type was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
/home/cermak/src/\+M\+O\+M6.\+devrob/src/\+A\+L\+E/coord\+\_\+hycom.\+F90\end{DoxyCompactItemize}
