\hypertarget{structscm__cvmix__tests_1_1scm__cvmix__tests__cs}{}\section{scm\+\_\+cvmix\+\_\+tests\+:\+:scm\+\_\+cvmix\+\_\+tests\+\_\+cs Type Reference}
\label{structscm__cvmix__tests_1_1scm__cvmix__tests__cs}\index{scm\+\_\+cvmix\+\_\+tests\+::scm\+\_\+cvmix\+\_\+tests\+\_\+cs@{scm\+\_\+cvmix\+\_\+tests\+::scm\+\_\+cvmix\+\_\+tests\+\_\+cs}}


\subsection{Detailed Description}
Container for surface forcing parameters. 

Definition at line 34 of file S\+C\+M\+\_\+\+C\+V\+Mix\+\_\+tests.\+F90.



Collaboration diagram for scm\+\_\+cvmix\+\_\+tests\+:\+:scm\+\_\+cvmix\+\_\+tests\+\_\+cs\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=249pt]{structscm__cvmix__tests_1_1scm__cvmix__tests__cs__coll__graph}
\end{center}
\end{figure}
\subsection*{Private variables and constants}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{structscm__cvmix__tests_1_1scm__cvmix__tests__cs_a893f22b7028da480f228b53e6d15e584}\label{structscm__cvmix__tests_1_1scm__cvmix__tests__cs_a893f22b7028da480f228b53e6d15e584}} 
logical \mbox{\hyperlink{structscm__cvmix__tests_1_1scm__cvmix__tests__cs_a893f22b7028da480f228b53e6d15e584}{usewindstress}}
\begin{DoxyCompactList}\small\item\em True to use wind stress. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structscm__cvmix__tests_1_1scm__cvmix__tests__cs_a3575438fa4c9dd5974aeb643c0ab24e2}\label{structscm__cvmix__tests_1_1scm__cvmix__tests__cs_a3575438fa4c9dd5974aeb643c0ab24e2}} 
logical \mbox{\hyperlink{structscm__cvmix__tests_1_1scm__cvmix__tests__cs_a3575438fa4c9dd5974aeb643c0ab24e2}{useheatflux}}
\begin{DoxyCompactList}\small\item\em True to use heat flux. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structscm__cvmix__tests_1_1scm__cvmix__tests__cs_a44d49e75238b5ebcc89902dd678eab6b}\label{structscm__cvmix__tests_1_1scm__cvmix__tests__cs_a44d49e75238b5ebcc89902dd678eab6b}} 
logical \mbox{\hyperlink{structscm__cvmix__tests_1_1scm__cvmix__tests__cs_a44d49e75238b5ebcc89902dd678eab6b}{useevaporation}}
\begin{DoxyCompactList}\small\item\em True to use evaporation. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structscm__cvmix__tests_1_1scm__cvmix__tests__cs_a6f9dd60a925e4c372529fdc0b1c4dcf8}\label{structscm__cvmix__tests_1_1scm__cvmix__tests__cs_a6f9dd60a925e4c372529fdc0b1c4dcf8}} 
logical \mbox{\hyperlink{structscm__cvmix__tests_1_1scm__cvmix__tests__cs_a6f9dd60a925e4c372529fdc0b1c4dcf8}{usediurnalsw}}
\begin{DoxyCompactList}\small\item\em True to use diurnal sw radiation. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structscm__cvmix__tests_1_1scm__cvmix__tests__cs_aa0ee51abd28a12f3262aca895e6a00e2}\label{structscm__cvmix__tests_1_1scm__cvmix__tests__cs_aa0ee51abd28a12f3262aca895e6a00e2}} 
real \mbox{\hyperlink{structscm__cvmix__tests_1_1scm__cvmix__tests__cs_aa0ee51abd28a12f3262aca895e6a00e2}{tau\+\_\+x}}
\begin{DoxyCompactList}\small\item\em (Constant) Wind stress, X \mbox{[}Pa\mbox{]} \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structscm__cvmix__tests_1_1scm__cvmix__tests__cs_ad51bc431944ff2d3e380a4a1af53aad7}\label{structscm__cvmix__tests_1_1scm__cvmix__tests__cs_ad51bc431944ff2d3e380a4a1af53aad7}} 
real \mbox{\hyperlink{structscm__cvmix__tests_1_1scm__cvmix__tests__cs_ad51bc431944ff2d3e380a4a1af53aad7}{tau\+\_\+y}}
\begin{DoxyCompactList}\small\item\em (Constant) Wind stress, Y \mbox{[}Pa\mbox{]} \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structscm__cvmix__tests_1_1scm__cvmix__tests__cs_aa67a49aa1c412e4c2f193c17f2b34eba}\label{structscm__cvmix__tests_1_1scm__cvmix__tests__cs_aa67a49aa1c412e4c2f193c17f2b34eba}} 
real \mbox{\hyperlink{structscm__cvmix__tests_1_1scm__cvmix__tests__cs_aa67a49aa1c412e4c2f193c17f2b34eba}{surf\+\_\+hf}}
\begin{DoxyCompactList}\small\item\em (Constant) Heat flux \mbox{[}degC Z T-\/1 $\sim$$>$ m degC s-\/1\mbox{]} \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structscm__cvmix__tests_1_1scm__cvmix__tests__cs_a181ab4e18023070db98a742687b6c0dc}\label{structscm__cvmix__tests_1_1scm__cvmix__tests__cs_a181ab4e18023070db98a742687b6c0dc}} 
real \mbox{\hyperlink{structscm__cvmix__tests_1_1scm__cvmix__tests__cs_a181ab4e18023070db98a742687b6c0dc}{surf\+\_\+evap}}
\begin{DoxyCompactList}\small\item\em (Constant) Evaporation rate \mbox{[}Z T-\/1 $\sim$$>$ m s-\/1\mbox{]} \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structscm__cvmix__tests_1_1scm__cvmix__tests__cs_a01da79637b2767ec8555a035eefc0088}\label{structscm__cvmix__tests_1_1scm__cvmix__tests__cs_a01da79637b2767ec8555a035eefc0088}} 
real \mbox{\hyperlink{structscm__cvmix__tests_1_1scm__cvmix__tests__cs_a01da79637b2767ec8555a035eefc0088}{max\+\_\+sw}}
\begin{DoxyCompactList}\small\item\em maximum of diurnal sw radiation \mbox{[}degC Z T-\/1 $\sim$$>$ degC m s-\/1\mbox{]} \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structscm__cvmix__tests_1_1scm__cvmix__tests__cs_a53ea2c4a4715dad7c7c5d8fb60c436bd}\label{structscm__cvmix__tests_1_1scm__cvmix__tests__cs_a53ea2c4a4715dad7c7c5d8fb60c436bd}} 
real \mbox{\hyperlink{structscm__cvmix__tests_1_1scm__cvmix__tests__cs_a53ea2c4a4715dad7c7c5d8fb60c436bd}{rho0}}
\begin{DoxyCompactList}\small\item\em reference density \mbox{[}R $\sim$$>$ kg m-\/3\mbox{]} \end{DoxyCompactList}\end{DoxyCompactItemize}


\subsection{Detailed Description}
Container for surface forcing parameters. 

Definition at line 34 of file S\+C\+M\+\_\+\+C\+V\+Mix\+\_\+tests.\+F90.



The documentation for this type was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
/home/cermak/src/\+M\+O\+M6.\+devrob/src/user/S\+C\+M\+\_\+\+C\+V\+Mix\+\_\+tests.\+F90\end{DoxyCompactItemize}
