\hypertarget{structmom__energetic__pbl_1_1epbl__column__diags}{}\section{mom\+\_\+energetic\+\_\+pbl\+:\+:epbl\+\_\+column\+\_\+diags Type Reference}
\label{structmom__energetic__pbl_1_1epbl__column__diags}\index{mom\+\_\+energetic\+\_\+pbl\+::epbl\+\_\+column\+\_\+diags@{mom\+\_\+energetic\+\_\+pbl\+::epbl\+\_\+column\+\_\+diags}}


\subsection{Detailed Description}
A type for conveniently passing around e\+P\+BL diagnostics for a column. 

Definition at line 229 of file M\+O\+M\+\_\+energetic\+\_\+\+P\+B\+L.\+F90.



Collaboration diagram for mom\+\_\+energetic\+\_\+pbl\+:\+:epbl\+\_\+column\+\_\+diags\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=228pt]{structmom__energetic__pbl_1_1epbl__column__diags__coll__graph}
\end{center}
\end{figure}
\subsection*{Public variables and constants}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{structmom__energetic__pbl_1_1epbl__column__diags_a23facad225bfa9fafab59cc594f77b66}\label{structmom__energetic__pbl_1_1epbl__column__diags_a23facad225bfa9fafab59cc594f77b66}} 
real \mbox{\hyperlink{structmom__energetic__pbl_1_1epbl__column__diags_a23facad225bfa9fafab59cc594f77b66}{la}}
\begin{DoxyCompactList}\small\item\em The value of the Langmuir number \mbox{[}nondim\mbox{]}. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__energetic__pbl_1_1epbl__column__diags_a7a07de577c8c992cd1f0469b2b676419}\label{structmom__energetic__pbl_1_1epbl__column__diags_a7a07de577c8c992cd1f0469b2b676419}} 
real \mbox{\hyperlink{structmom__energetic__pbl_1_1epbl__column__diags_a7a07de577c8c992cd1f0469b2b676419}{lamod}}
\begin{DoxyCompactList}\small\item\em The modified Langmuir number by convection \mbox{[}nondim\mbox{]}. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__energetic__pbl_1_1epbl__column__diags_a788d424574628079b9f6c1d24b85b2a8}\label{structmom__energetic__pbl_1_1epbl__column__diags_a788d424574628079b9f6c1d24b85b2a8}} 
real \mbox{\hyperlink{structmom__energetic__pbl_1_1epbl__column__diags_a788d424574628079b9f6c1d24b85b2a8}{mstar}}
\begin{DoxyCompactList}\small\item\em The value of mstar used in e\+P\+BL \mbox{[}nondim\mbox{]}. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__energetic__pbl_1_1epbl__column__diags_a666b53c6693640574cef34a26d1d5761}\label{structmom__energetic__pbl_1_1epbl__column__diags_a666b53c6693640574cef34a26d1d5761}} 
real \mbox{\hyperlink{structmom__energetic__pbl_1_1epbl__column__diags_a666b53c6693640574cef34a26d1d5761}{mstar\+\_\+lt}}
\begin{DoxyCompactList}\small\item\em The portion of mstar due to Langmuir turbulence \mbox{[}nondim\mbox{]}. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__energetic__pbl_1_1epbl__column__diags_ad8572cabf15226d88f110509d0ca484b}\label{structmom__energetic__pbl_1_1epbl__column__diags_ad8572cabf15226d88f110509d0ca484b}} 
real, dimension(\+:), allocatable \mbox{\hyperlink{structmom__energetic__pbl_1_1epbl__column__diags_ad8572cabf15226d88f110509d0ca484b}{dt\+\_\+expect}}
\begin{DoxyCompactList}\small\item\em Expected temperature changes \mbox{[}degC\mbox{]}. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__energetic__pbl_1_1epbl__column__diags_a49f62199569ac4655941b0930418ca12}\label{structmom__energetic__pbl_1_1epbl__column__diags_a49f62199569ac4655941b0930418ca12}} 
real, dimension(\+:), allocatable \mbox{\hyperlink{structmom__energetic__pbl_1_1epbl__column__diags_a49f62199569ac4655941b0930418ca12}{ds\+\_\+expect}}
\begin{DoxyCompactList}\small\item\em Expected salinity changes \mbox{[}ppt\mbox{]}. \end{DoxyCompactList}\end{DoxyCompactItemize}
\textbf{ }\par
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{structmom__energetic__pbl_1_1epbl__column__diags_a05381b9b035cd5b68e0d07f04f4446ac}\label{structmom__energetic__pbl_1_1epbl__column__diags_a05381b9b035cd5b68e0d07f04f4446ac}} 
real \mbox{\hyperlink{structmom__energetic__pbl_1_1epbl__column__diags_a05381b9b035cd5b68e0d07f04f4446ac}{dtke\+\_\+conv}}
\begin{DoxyCompactList}\small\item\em Local column copies of energy change diagnostics, all in \mbox{[}R Z3 T-\/3 $\sim$$>$ W m-\/2\mbox{]}. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__energetic__pbl_1_1epbl__column__diags_a1bda1719c5b92e88f53a9f835b38a931}\label{structmom__energetic__pbl_1_1epbl__column__diags_a1bda1719c5b92e88f53a9f835b38a931}} 
real \mbox{\hyperlink{structmom__energetic__pbl_1_1epbl__column__diags_a1bda1719c5b92e88f53a9f835b38a931}{dtke\+\_\+forcing}}
\begin{DoxyCompactList}\small\item\em Local column copies of energy change diagnostics, all in \mbox{[}R Z3 T-\/3 $\sim$$>$ W m-\/2\mbox{]}. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__energetic__pbl_1_1epbl__column__diags_a037ba67e855ded265d77cdd0a6696455}\label{structmom__energetic__pbl_1_1epbl__column__diags_a037ba67e855ded265d77cdd0a6696455}} 
real \mbox{\hyperlink{structmom__energetic__pbl_1_1epbl__column__diags_a037ba67e855ded265d77cdd0a6696455}{dtke\+\_\+wind}}
\begin{DoxyCompactList}\small\item\em Local column copies of energy change diagnostics, all in \mbox{[}R Z3 T-\/3 $\sim$$>$ W m-\/2\mbox{]}. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__energetic__pbl_1_1epbl__column__diags_ac33240672848773b7d05ec3885b392e8}\label{structmom__energetic__pbl_1_1epbl__column__diags_ac33240672848773b7d05ec3885b392e8}} 
real \mbox{\hyperlink{structmom__energetic__pbl_1_1epbl__column__diags_ac33240672848773b7d05ec3885b392e8}{dtke\+\_\+mixing}}
\begin{DoxyCompactList}\small\item\em Local column copies of energy change diagnostics, all in \mbox{[}R Z3 T-\/3 $\sim$$>$ W m-\/2\mbox{]}. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__energetic__pbl_1_1epbl__column__diags_ad1b875ce7017e59ab4c11acae287f942}\label{structmom__energetic__pbl_1_1epbl__column__diags_ad1b875ce7017e59ab4c11acae287f942}} 
real \mbox{\hyperlink{structmom__energetic__pbl_1_1epbl__column__diags_ad1b875ce7017e59ab4c11acae287f942}{dtke\+\_\+mke}}
\begin{DoxyCompactList}\small\item\em Local column copies of energy change diagnostics, all in \mbox{[}R Z3 T-\/3 $\sim$$>$ W m-\/2\mbox{]}. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__energetic__pbl_1_1epbl__column__diags_a98dea091538576a5d4b0e6bbf22b8df6}\label{structmom__energetic__pbl_1_1epbl__column__diags_a98dea091538576a5d4b0e6bbf22b8df6}} 
real \mbox{\hyperlink{structmom__energetic__pbl_1_1epbl__column__diags_a98dea091538576a5d4b0e6bbf22b8df6}{dtke\+\_\+mech\+\_\+decay}}
\begin{DoxyCompactList}\small\item\em Local column copies of energy change diagnostics, all in \mbox{[}R Z3 T-\/3 $\sim$$>$ W m-\/2\mbox{]}. \end{DoxyCompactList}\item 
\mbox{\Hypertarget{structmom__energetic__pbl_1_1epbl__column__diags_ab0f8013a0661107f5ce734c86312c7df}\label{structmom__energetic__pbl_1_1epbl__column__diags_ab0f8013a0661107f5ce734c86312c7df}} 
real \mbox{\hyperlink{structmom__energetic__pbl_1_1epbl__column__diags_ab0f8013a0661107f5ce734c86312c7df}{dtke\+\_\+conv\+\_\+decay}}
\begin{DoxyCompactList}\small\item\em Local column copies of energy change diagnostics, all in \mbox{[}R Z3 T-\/3 $\sim$$>$ W m-\/2\mbox{]}. \end{DoxyCompactList}\end{DoxyCompactItemize}



\subsection{Detailed Description}
A type for conveniently passing around e\+P\+BL diagnostics for a column. 

Definition at line 229 of file M\+O\+M\+\_\+energetic\+\_\+\+P\+B\+L.\+F90.



The documentation for this type was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
/home/cermak/src/\+M\+O\+M6.\+devrob/src/parameterizations/vertical/M\+O\+M\+\_\+energetic\+\_\+\+P\+B\+L.\+F90\end{DoxyCompactItemize}
