In M\+O\+M6, it is common to have at least four different timesteps\+: the barotropic timestep, the baroclinic (momentum dynamics) timestep, the tracer timestep, and the remapping interval. There can also be a forcing timestep on which model coupling occurs.


\begin{DoxyImage}
\includegraphics[width=\textwidth,height=\textheight/2,keepaspectratio=true]{timesteps_4.png}
\doxyfigcaption{Graphic representation of the various timesteps used by M\+O\+M6.}
\end{DoxyImage}
